realimag tran1: rcrc ladder

13o347o919o341o628o332o437o323o358o302o1.875o285o1.396o264o0.9118o242o0.6136o224o0.4152o208o0.25

169o191o0.10o180oe0ac.v(3) ac.v(4) ac.v(5) ac.v(6)