frequency tran1: rcrc ladder

10^3

10^4

10^5

10^6

Hz-0.50.00.51.01.52.0Vac.v(3) ac.v(4) ac.v(5) ac.v(6) ac.v(7) ac.v(8) ac.v(9) ac.v(10)